\begin{titlepage}
\begin{center}
\fboxrule=1mm
\fbox{
\begin{minipage}[t]{0pt}          %Korrekt h{\o}yde p{\aa} rammen
\mbox{}                           %h{\o}yde som en bokstav
\vspace*{0.94\textheight}         %mer h{\o}yde...
\end{minipage}
\begin{minipage}[t]{0.99\textwidth} %Inne i rammen...
   \mbox{ }\\
   \begin{center}
   \large\bf Nansen Environmental and Remote Sensing Center \\[3mm]
   \fboxrule = 0.4pt
\begin{tabular}{ccc}
   \parbox[b]{0.23\textwidth}{
      \begin{flushright}
         \small\it
         A non-profit
         environmental research
         center  affiliated with the
         University of Bergen
      \end{flushright}
        }
   &\fbox{\includegraphics[width=0.20\textwidth]{./logo.jpg}} &
   %&\fbox{\includegraphics[width=0.20\textwidth]{./Pics/nersc.eps}} &
   \parbox[b]{0.23\textwidth}{
      \small\it
      \begin{flushleft}
         Thorm{\o}hlensgate 47 \\
         N-5006 Bergen, Norway\\
         Tel: +47 55 20 58 00 \\
         Fax: +47 55 20 58 01
      \end{flushleft}
   }
\end{tabular}
\mbox{}\\[10mm]
  \Large Technical Report No. \repno \\[2.5cm]
\LARGE\bf \reptit \\[15mm]
\normalsize by\\[1cm]
\Large\bf \repautors \\[2.5cm]
\mbox{}\\[34mm]
   \Large\bf Draft from \today \\
   %\Large\bf September 2002 \\
\end{center}
\end{minipage}
}
\end{center}
\end{titlepage}
